import { redirect } from "next/navigation";
import { isAdminUiEnabled } from "@/lib/server/admin-auth";

export default function SignInPage() {
  if (!isAdminUiEnabled()) {
    redirect("/");
  }

  return (
    <div className="flex min-h-screen items-center justify-center bg-muted/30 px-6">
      <div className="max-w-md rounded-2xl border border-border bg-background p-8 text-center shadow-sm">
        <h1 className="text-2xl font-semibold">Admin Sign-In</h1>
        <p className="mt-3 text-sm text-muted-foreground">
          Admin sign-in is not configured in this deployment. Enable the admin
          UI and wire an auth provider before using this area.
        </p>
      </div>
    </div>
  );
}
